Test

Entries 2 Mean 2.5e-05 RMS 1.5e-05

0 0.00010.00020.00030.00040.00050.00060.00070.00080.00090.001 0

0.2

0.4

0.6

0.8

1 Linear Axis b_{Entries 2}

Mean 2.5e-05 RMS 1.5e-05

-710^{-6}10^{-5}10^{-4}10^{-3}10 0

0.2

0.4

0.6

0.8

1 b Entries 2

Default Log Axis

c Entries 2 Mean 2.5e-05 RMS 1.5e-05

-510^{-4}10^{-3}10 0

0.2

0.4

0.6

0.8

1 c Log Axis, min=0.00001^d_{Entries 2}

Mean 2.5e-05 RMS 1.5e-05

-410 0

0.2

0.4

0.6

0.8

1 d Entries 2

Log Axis, min=0.00005